) [MeV]

−μ^+μ(m

1000 2000 3000 4000

-210

-110

1 LHCb

=1000ps τ

=100ps τ

=10ps τ =0ps τ =1psτ

))^−μ^+μ(χ^{*0}K→^0B(B 2 )[1.1,6.0]GeV

−μ^+μ^{*0}K→^0B(B

))^−μ^+μ(χ^{*0}K→^0B(B

-910

-810

-710