% $Id: title-LHCb-PAPER.tex 122889 2018-08-17 17:59:55Z pkoppenb $
% ===============================================================================
% Purpose: LHCb-PAPER journal paper title page template
% Author: 
% Created on: 2010-09-25
% ===============================================================================

%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%  TITLE PAGE  %%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{titlepage}
\pagenumbering{roman}

% Header ---------------------------------------------------
\vspace*{-1.5cm}

\vspace*{1.5cm}
\noindent
\begin{tabular*}{\linewidth}{lc@{\extracolsep{\fill}}r@{\extracolsep{0pt}}}
\ifthenelse{\boolean{pdflatex}}% Logo format choice
{\vspace*{-1.5cm}\mbox{\!\!\!\includegraphics[width=.14\textwidth]{figs/lhcb-logo.pdf}} & &}%
{\vspace*{-1.2cm}\mbox{\!\!\!\includegraphics[width=.12\textwidth]{figs/lhcb-logo.eps}} & &}%
\\
 & & CERN-EP-20XX-ZZZ \\  % ID 
 & & LHCb-PAPER-20XX-YYY \\  % ID 
 & & \today \\ % Date - Can also hardwire e.g.: 23 March 2010
 & & \\
% not in paper \hline
\end{tabular*}

\vspace*{4.0cm}

% Title --------------------------------------------------
{\normalfont\bfseries\boldmath\huge
\begin{center}
% DO NOT EDIT HERE. Instead edit macro in main.tex to keep metadata correct
  \papertitle 
\end{center}
}

\vspace*{2.0cm}

% Authors -------------------------------------------------
\begin{center}
%In the footnote, replace 'paper' by 'Letter' in case of submission to PRL or PLB 
% Edit macro in main.tex to keep metadata correct
\paperauthors\footnote{Authors are listed at the end of this paper.}
\end{center}

\vspace{\fill}

% Abstract -----------------------------------------------
\begin{abstract}
  \noindent
zfit is a library for model fitting in pure python based on TensorFlow, a modern computing framework with a declarative, graph-based approach. zfit combines low level interaction to build custom models as well as high level interfaces. A well defined formalization of the workflow into model building, data loading, loss creation, minimization process and error estimation and their implementation is described.
  
\end{abstract}

\vspace*{2.0cm}



\vspace{\fill}

%{\footnotesize 
% Edit macro in main.tex to keep metadata correct
% \centerline{\copyright~\papercopyright. \href{\paperlicenceurl}{\paperlicence}.}}
\vspace*{2mm}

\end{titlepage}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%  EOD OF TITLE PAGE  %%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%  empty page follows the title page ----
\newpage
\setcounter{page}{2}
\mbox{~}
%\newpage
%
%% Author List ----------------------------
%%  You need to get a new author list!
%\input{LHCb_authorlist.tex}
%
%The author list for journal publications is provided by the Membership Committee shortly after 'approval to go to paper' has been given.
%%It will be made available on the page
%%\verb!http://www.physik.uzh.ch/~strauman/forMemCo/LHCb-PAPER-XXXX-XXX/! .
%It will be sent to you by email shortly after a paper number has beens assigned.
%The author list should be included already at first circulation, 
%to allow new members of the collaboration to verify whether they have been included correctly.
%Occasionally a misspelled name is corrected or associated institutions become full members.
%In that case, a new author list will be sent to you.
%In case line numbering doesn't work well after including the authorlist, try moving the \verb!\bigskip! after the last author to a separate line.
%
%
%The authorship for Conference Reports should be ``The LHCb
%  collaboration'', with a footnote giving the name(s) of the contact
%  author(s), but without the full list of collaboration names.



\cleardoublepage







