\ifx\mcitethebibliography\mciteundefinedmacro
\PackageError{LHCb.bst}{mciteplus.sty has not been loaded}
{This bibstyle requires the use of the mciteplus package.}\fi
\providecommand{\href}[2]{#2}
\begin{mcitethebibliography}{}
\mciteSetBstSublistMode{n}
\mciteSetBstMaxWidthForm{subitem}{\alph{mcitesubitemcount})}
\mciteSetBstSublistLabelBeginEnd{\mcitemaxwidthsubitemform\space}
{\relax}{\relax}

\end{mcitethebibliography}
